Figur e 1: Sensitivity to Time-Out Inter vals. In this simulation, we impose no maximum time-out limit, recording what percentage of requests could be handled by already open connections, as a function of the timeout interval. There is little additional benefit derived from leaving connections open longer than 15 seconds.

0 25 50 75

0 30 60 90 120 150 180

% Requests handled by open connections

Time-out (in seconds)

Free Software Site Traditional Business Site Harvard FAS Site